; module-definition file for mgrtest -- used by LINK.EXE

NAME         wthook      ; application's module name

DESCRIPTION  'Sample Microsoft Windows Application'

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     57900
STACKSIZE    6000


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
;        MainWndProc   @1   ; name of window processing function
;        About         @2   ; name of "About" processing function
;        Do1Context                      ; enumeration callback function
;        ButtonDlgProc
